0.0 0.2 0.4 0.6 0.8 1.0 0 200 400 600

0.0 0.2 0.4 0.6 0.8 150 200 250 300 350

4 6 8 10 12 14 16 18 20

0.00

0.02

0.04

0.06

0.08

0.10

0.12

SBA-15

Dv(d)/cm^3/g STP

Pore diameter/nm

SBA-15SO_3H

SBA-15SO_3H SBA-15

Relative pressure, p/p_0

2 4 6 8 10 12 14 16 18 20 0

10

20

30

SBA-16SO_3H

Dv(d)/cm^3A^{-1}g^{-1}

Pore diameter/nm

SBA-16

SBA-16SO_3H SBA-16

Adsorbed volume, cm^3(STP)g^{-1}

Relative pressure, p/p_0